− 1.0

− 0.5 0.0 0.5 1.0 1.5 log (100 HCN/CO) n_H = 1 × 10^3 n_H = 5 × 10^3 n_H = 1 × 10^4

0.4 0.6 0.8 1.0 1.2 1.4 1.6 log A_v (mag.)

n_H = 5 × 10^4

0.4 0.6 0.8 1.0 1.2 1.4 1.6 log A_v (mag.)

− 1.0

− 0.5 0.0 0.5 1.0 1.5 log (100 HCN/CO) n_H = 1 × 10^5

0.4 0.6 0.8 1.0 1.2 1.4 1.6 log A_v (mag.)

n_H = 5 × 10^5

0.4 0.6 0.8 1.0 1.2 1.4 1.6 log A_v (mag.)

n_H = 1 × 10^6

subsolar solar G_0=10 G_0=50 G_0=100 observed M33