5250 5260 5270 5280 5290 5300 0.8

0.9

1.0

Cr I

Fe I

Fe I

Cr II

Fe II

Fe I Fe I

Fe I

Fe II

Fe II normalized flux wavelength (Angstroem)

Ca I