-0.1 0 0.1 0.2 0.3 0.4 0.5

ρuv

Correlation coefficients

-0.1

0

0.1

0.2 ρuw

0.2 0.3 0.4 0.5 -0.1

0

0.1

0.2

0.3 b-y ρvw