0.5 0.6 0.7 0.8 0.9 1.0

Normalized flux

1 2 3 4 5 6 7 8 9 10

− 0.8

− 0.6

− 0.4

− 0.2 0.0

Slope Γ (^1_{Flux in Crab} )

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

Pulse phase − 6 − 4 − 2 0 2 4 6

Slope E_{cyc} (^{keV}_{Flux in Crab} )