0.36

0.38

0.40

0.42

0.44

0.46

Photon index Γ

1000 1200 1400 1600 1800 Pulse height in PCA cts/s [2–90 keV]

44.0

44.5

45.0

45.5

46.0

46.5

47.0

E_{cyc} [keV]