4553.5 4554.0 4554.5 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1.0

RELATIVE FLUX

5853.0 5853.5 5854.0 0.5 0.6 0.7 0.8 0.9 1.0

HD 122064

6141.5 6142.0 0.4 0.5 0.6 0.7 0.8 0.9 1.0

6496.5 6497.0 λ 0.5 0.6 0.7 0.8 0.9 1.0

(A)