DECLINATION (J2000)

RIGHT ASCENSION (J2000)

04 34 02.0 01.5 01.0 00.5 00.0 33 59.5 59.0 58.5

-08 34 153045

35 0015

Contours = CO 1-0

Greyscale = HST ACS 435W