-4000 -3000 -2000 -1000 0 1000 2000 3000 4000

V (km/s) 0.4

0.5

0.6

0.7

0.8

0.9

1.0

1.1

I/I_o

H Cep

35^o(red) < i < 90^o(blue)

V_{eq} = 267 km/s

= 0.0

= 0.57

Calculated line profiles: Cep (observed) (a)