0.8

0.6

0.4

0.2

0.0

E(B-V)

200 150 100 50 0 Equivalent Width (mA)

Coefficient values – one standard deviation a =0.0024499 – 0.00715 b =0.0024967 – 0.000108 V_pr : 0.94

5780.4 DIB