0.8

0.6

0.4

0.2

0.0

E(B-V)

12 10 8 6 4 2 Equivalent Width (mA)

Coefficient values – one standard deviation a =-0.042877 – 0.0373 b =0.070535 – 0.00751 V_pr : 0.92

6089.9 DIB