0.8

0.6

0.4

0.2

0.0

E(B-V)

70 60 50 40 30 20 10 Equivalent Width (mA)

Coefficient values – one standard deviation a =-0.045734 – 0.0198 b =0.011871 – 0.000808

6204 DIB