0.8

0.6

0.4

0.2

0.0

E(B-V)

500 400 300 200 100 Equivalent Width (mA)

Coefficient values – one standard deviation a =-0.014 – 0.020 b =0.00081 – 0.00008 V_pr : 0.83

6283.8 DIB