0.8

0.6

0.4

0.2

0.0

E(B-V)

60 40 20 0 Equivalent Width (mA)

Coefficient values – one standard deviation a =0.040094 – 0.0126 b =0.009404 – 0.000611 V_pr : 0.93

6379.3 DIB