0.8

0.6

0.4

0.2

0.0

E(B-V)

20 15 10 5 Equivalent Width (mA)

Coefficient values – one standard deviation a =-0.078332 – 0.013 b =0.036277 – 0.00215 V_pr : 0.91

6445.3 DIB