0.8

0.6

0.4

0.2

0.0

E(B-V)

20 15 10 5 Equivalent Width (mA)

Coefficient values – one standard deviation a =-0.071787 – 0.0203 b =0.038043 – 0.00298 V_pr : 0.89

6699.3 DIB