0 1 2 3 4 5 6

0.992

0.994

0.996

0.998 1 1.002

1.004

1.006

RelativeFlux

CoRoT-25

0 1 2 3 4 5 6 -5 0 5 x 10^{-3}

Time (hours)

S−Sfit