CO Model: Integrated Intensity

10

10

10

10

20

20

20

30

30

30

40

40

40

50

50

60

60

70

80

Dec Offset [pc]

RA Offset [pc]

-100 -50 0 50 100

-100

-50

0

50

100

Jy beam -1 km s -1

10 20 30 40 50 60 70 80