10100surface brightness

40.0

30.0

20.0

10.0

8:59:00.0

50.0

58:20.0

26:00.0

28:00.0

-47:30:00.0

32:00.0

34:00.0

36:00.0

DEC (J2000)

RA (J2000) (b)