-1 0 1 2 3 0.0

0.2

0.4

0.6

0.8

1.0

-1 0 1 2 3 4

F(> ) m*<m<m*+1 m*-1<m<m* AGN 0.1<z<0.55 Real, 0-0.4 Mpc Random, 0-0.4 Mpc Real , 0.4-0.8 Mpc Random, 0.4-0.8 Mpc