Event No. 12 Time (UT) 14:30 14:54 15:06 15:18 15:30 15:42 16:18 17:18 17:42 CME height (R_�) 3.2 4.1 4.2 5.2 6.4 8.0 12.1 19.0 21.9 type II height (R_�), hybrid model 10.9 12.1 15.2 22.0 25.0 type II frequency (kHz), lane center 900 750 520 300 250