Event No. 16 Time (UT) 00:26 00:42 00:50 01:42 02:18 02:42 03:18 CME height (R_�) 4.2 5.8 7.0 12.6 16.3 18.4 22.2 type II height (R_�), hybrid model 6.1 9.3 14.0 type II frequency (kHz), lane center 2700 1200 600