Event No. 17 Time (UT) 06:30 06:42 07:42 08:42 09:00 CME height (R_�) 5.8 7.9 18.8 29.0 type II height (R_�), hybrid model 11.7 21.0 28.0 29.0 type II frequency (kHz), lane center 800 320 220 210