Event No. 18 Time (UT) 23:06 23:18 23:42 00:18 01:00 CME height (R_�) 7.3 10.4 16.5 24.9 type II height (R_�), hybrid model 16.5 23.0 29.0 type II frequency (kHz), lane center 460 280 210