Event No. 19 Time (UT) 12:32 12:38 13:08 13:38 14:38 CME height (R_�) 5.2 6.4 15.3 23.6 type II height (R_�), hybrid model 12.6 16.5 24.0 type II frequency (kHz), lane center 700 460 270