Event No. 2 Time (UT) 05:35 07:15 07:30 07:45 08:00 08:15 08:30 08:45 10:00 CME height (R_�) 2.7 14.0 16.1 18.3 19.8 21.9 23.8 26.2 type II height (R_�), hybrid model 13.3 15.4 16.5 17.5 18.0 19.7 25.0 type II frequency (kHz), lane center 650 510 460 420 400 350 250