(deg) θ 0 2 4 6 8 10 12 0 50 100 150 200 250 300 SIM_30_00_FMG100 King Function Entries 14013 / ndf

2χ 295.7 / 197 B 0.85±

28.94 δ 0.022±

1.597 γ 0.031± 2.097

SIM_30_00_FMG100