(deg) θ 0 0.5 1 1.5 2 2.5 3 3.5 0 100 200 300 400 500 600 700 SIM_30_00_FMG400 King Function Entries 9879 / ndf

2χ 206.9 / 197 B 8.8±

289.9 δ 0.006±

0.422 γ 0.019± 1.861

SIM_30_00_FMG400