-23 -22 -21 -20 -19 -18 -17 -16 -15 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

M_B^{host} (mag)

CDF

87A-like IIP Ib Ic IIn IIb