277.875

277.9375 278 278.0625

278.125

-19

277.8125 277.75

-19.25

-19.2

-19.15

-19.1

-19.05

001 91%

NEAR-IR (2MASS J)

1’ 17.75’ x 18.9’

N

E Powered by Aladin