DECLINATION (J2000)

RIGHT ASCENSION (J2000)

01 35 30 00 34 30 00 33 30 00 32 30

31 1000 30 5040302010 303540455055

Plot file version 3 created 06-MAY-2012 14:57:15

Grey scale flux range= 30.00 50.00 Kelvin

GREY: M33 m33-Twnew.CONVL.1

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

01 35 30 00 34 30 00 33 30 00 32 30

31 10

00

30 50

40

30

20

10 30

35

40

45

50