15:00.0

50.040.030.020.010.05:14:00.0

50.040.013:30.0

36:00.0

37:00.0

38:00.0

39:00.0

-68:40:00.0

41:00.0

42:00.0

43:00.0

44:00.0

RA (J2000)

Dec (J2000)

0.3-0.7 keV contours