30 40 50 60 70 80 30

40

50

60

70

80

Δν with FT ( μHz)

Δν with TOUCAN ( μHz)

[Fe/H]=-0.12, α=0.5, d^{ov}=0.1

[Fe/H]=-0.52, α=1.5, d^{ov}=0.3

[Fe/H]=-0.08, α=1.0, d^{ov}=0.2

Linear fit: 0.64819·x+7.9592