5600 5650 5700 5750 5800 5850 5900

-0.3

-0.2

-0.1

0.0

0.1

0.2

0.3

[Fe/H]

Teff (colors) (K)

0 1.363

2.725

4.088

5.450

6.813

8.175

9.538

10.90