5600 5650 5700 5750 5800 5850 5900

-0.3

-0.2

-0.1

0.0

0.1

0.2

0.3

[Fe/H]

Teff (colors( (K)

0 0.3675

0.7350

1.103

1.470

1.837

2.205

2.573

2.940