0 50 100 150 200 250 300 350 400 450 500 0 0.5 1 1.5

Years

Bϕ2 [105 G]

B_ϕ^2 at r = 0.706R,θ=14ºN (black) andθ=14ºS (red)

0 50 100 150 200 250 300 350 400 450 500 0 20 40 αBL [m s -1] α_{BL} north, mean value=28.4782

0 50 100 150 200 250 300 350 400 450 500 0 20 40 α_{BL} south, mean value=27.3876