3.6 3.65 3.7

1 1.5 2 2.5 3 3.5 4 1.5

3.0 4.0

[Na/Fe]_{corr}

log Teff [K] logg [cgs]

-0.4

-0.2 0 0.2 0.4 0.6 0.8