50

200

500

10

100

1000

2 5 20 10

T in K r [AU]

Transition Ṁ = 1 × 10−7 Ṁ = 5 × 10−8 Ṁ = 3 × 10−8 Ṁ = 1 × 10−8 Ṁ = 5 × 10−9 r^{−1} fit