-0.4 -0.2 0.0 0.2 0.4 0.0

0.2

0.4

0.6

0.8

1.0

Phase(deg)

Intensity (A.U.)

Frequency offset (FSR)

Intensity

-180

-120 -60 0 60 120 180

Phase

(a)