1. Light curves

In this appendix the plots corresponding to the light curves are provided. Three plots per observation are presented, corresponding to soft (left), hard (middle), and total (right) energy bands. Each light curve has a minimum of 30 ks (i.e., 8 h) exposure time, while long light curves are divided into segments of 40 ks (i.e., 11 h). Each segment is enumerated in the title of the light curve. Count rates versus time continua are represented. The solid line represents the mean value, dashed lines the^+_�1œ from the average.