10^{-2} 10^{-1} 10^0

10^{-2}

10^{-1}

10^0

Formal error inα cos δ (mas)

Scatter of the Offset to ICRF2 in α cos δ (mas) aus2013a bkg2013a gsf2012a iaa2012a opa2013a