T_{eff} = 5777 K, log g = 4:44 T_{eff} = 6500 K, log g = 4:00 T_{eff} = 4500 K, log g = 2:00 T_{eff} = 4500 K, log g = 5:00

8:0 [Mm] 28:0 [Mm] 2400:0 [Mm] 1:4 [Mm]