50 100 150 200 250 300 0

0.5

1

1.5

2

2.5 x 10

-3 Mg I 61.504 7m

Time (days)

Lnorm

2011dh

2008ax 12A 12B 12C 12D 13A 13B 13C 13D 13E 13F 13G 17A