log10(Ecut[GeV])

P C

-0.5

0

0.5

1

1.5 SG

log_{10}(w)

OG

-2 -1.5 -1 -0.5 0

-0.5

0

0.5

1

1.5

log_{10}(w)

OP C

-2 -1.5 -1 -0.5 0