α [deg] ζ [deg]

SG Gamma-ray fit

20 40 60 80

10 20 30 40 50 60 70 80 90 α [deg]

Radio fit

20 40 60 80 α [deg]

Joint fit

20 40 60 80

5 10 15 20 25 30 35 40