5273.0 5273.5 5274.0 5274.5 5275.0 5275.5 5276.0 0.4

0.5

0.6

0.7

0.8

0.9

1.0

HD 149890 HD 88446

Relative intensity

¯

FeI FeI+CrI

CeII

CrII+FeI

CrI+FeI CrI

FeII+CrI+CoI