Center at RA 04 27 14.2100000 DEC -07 56 24.830000

J0427.2-0756 IPOL 4990.459 MHZ

Peak flux = 3.7958E-02 JY/BEAM Levs = 1.000E-03 * (-0.500, 0.500, 1, 2, 4, 6, 10, 15, 20, 25, 30, 50)

MilliArc seconds

MilliArc seconds

20 10 0 -10 -20

20

10

0

-10

-20

-30