Center at RA 01 26 15.3630000 DEC -05 01 18.520000

J0126.2-0500 IPOL 4990.459 MHZ

Peak flux = 3.9993E-04 JY/BEAM Levs = 1.000E-04 * (-0.300, 0.300, 0.500, 0.700, 1, 2, 3, 4, 5, 6)

MilliArc seconds

MilliArc seconds

20 15 10 5 0 -5 -10 -15 -20

15

10

5

0

-5

-10

-15

-20

-25

-30

-35