0 0.2 0.4 0.6 0.8 1 0

0.1

0.2

0.3

0.4

0.5

0.6

0.7

0.8

0.9

1

NCR

CDF

IIP (56) IIn (23) SN IM (12) 60% IIP + 40% SN IM (56)

0 20 40 60 80 100 0

0.1

0.2

0.3

0.4

0.5

0.6

0.7

0.8

0.9

Fraction of SN IMs / 100-fraction of SNe IIP [%]

P-value