(a) TiO_2 at 310.55 GHz (b) TiO_2 at 312.25 GHz (c) TiO_2 at 312.73 GHz (d) TiO_2 at 312.82 GHz

(e) TiO_2 at 321.40 GHz. (f) TiO_2 at 321.50 GHz (g) TiO_2 at 322.33 GHz (h) TiO_2 at 322.61 GHz

(i) TiO_2 at 324.49 GHz (j) TiO_2 at 324.97 GHz (k) TiO_2 at 325.32 GHz (l) TiO_2 at 325.50 GHz

(m) TiO_2 at 325.60 GHz