* HC_7N is not given because of large uncertainties of its tentative detection.

* Values of H^{13}_2 CO^{(1)} are derived from the temperatures the same as HCOOCH_3; Values of H^{13}_2 CO^{(2)} are derived from the temperatures the same as CH_3OH. * C_6H is not given because of large uncertainties of its tentative detection.